Ice growing in the lid cooled cavity.

Measurement of the temperature and velocity fields using liquid cystals (PIV & T)

Plexiglass walls: T_h = 20^oC, T_c = �10^oC.

Visualization of temperature fields under cooled lid using liquid cystals.

Cube: Plexiglass walls Glass walls Glass cylinder