Free surface - transient

Figure 1: Horizontal top plane (y=0.9) at t= 800s. Particle tracks:

10 � 40s. Ra=16500, Pr=8700.

Figure 2: Horizontal top plane (y=0.9) - after 2 hours. Particle tracks: 30 � 30s. Ra=16500, Pr=8700.