                                  Free surface natural convection in a

                       differentially heated rectangular cavity

     T.A. Kowalewski

                                                                                                        *
                                                                                                           , G. de Vahl Davis

�
 and E. Leonardi

�

                                            *
                                               IPPT PAN, Polish Academy of Sciences, PL 00-049 Warsaw

                                                                                    Email: Tomasz.Kowalewski@ippt.gov.pl

                                                    �
                                                       University of New South Wales, Sydney, Australia 2052.

                                     Email: G.deVahlDavis@unsw.edu.au, E.Leonardi@unsw.edu.au

Heat Transfer´98, 17-19 June 1998, Cracow, Poland.