0 20 40 60 80 100 120 140 160 180 200 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1

diameter [nm] relative frequency

Spectrum of particles

mean: 63 nm standard devation: 23 nm